0 0.5 1

14.2

14.4

14.6

    MDV90 EW 0.299660
B

0 0.5 1

15.4 15.6 15.8 16

    MDV92 RRC 0.312434
B

0 0.5 1

15.2 15.4 15.6 15.8 16 16.2 16.4

   MDV94 RRAB 0.492470
B

0 0.5 1

15.4 15.6 15.8 16 16.2

   MDV95 RRAB 0.603587
B

0 0.5 1

15 15.2 15.4 15.6 15.8

    MDV96 CWB: 4.22851
B

0 0.5 1

15.7 16 16.3 16.6 16.9

   MDV97 RRAB 0.555057
B

0 0.5 1

15.8 16 16.2 16.4

    MDV98 RRC 0.274916
B

0 0.5 1

14.9 15 15.1 15.2 15.3

    MDV99 EB 0.580428
B

0 0.5 1

14.2 14.4 14.6 14.8

   MDV100 RRC 0.312420
B

0 0.5 1

15.2 15.4 15.6 15.8 16

    MDV101 EW 0.545532
B

0 0.5 1

15.4 15.6 15.8 16 16.2 16.4

   MDV102 RRAB 0.761835
B

0 0.5 1

15.8

16

16.2

  MDV103 RRAB: 0.945095
B

0 0.5 1

15.8 16 16.2

    MDV104 EW 0.542425
B

0 0.5 1

15.3 15.5 15.7 15.9

    MDV106 CWA: 16.56
B

0 0.5 1

14.6

14.9

15.2

15.5

   MDV107 HADS 0.107927
B

0 0.5 1

15.6

15.8 16

   MDV109 RRC 0.350064
B

0 0.5 1

15.4 15.6 15.8 16 16.2

   MDV112 RRC: 0.332701
B

0 0.5 1

15.8 16 16.2 16.4 16.6 16.8

   MDV113 RRAB 0.464905
B

0 0.5 1

16.1 16.2 16.3 16.4

   MDV114 RRC: 0.284003
B

0 0.5 1

14.8 15 15.2 15.4 15.6

    MDV115 EW 0.547264
B

0 0.5 1

15.8 16 16.2 16.4 16.6

    MDV116 EB 0.913185
B

0 0.5 1

13.6 13.8 14 14.2 14.4

    MDV117 EB 0.425898
B

0 0.5 1

15 15.3 15.6 15.9 16.2

   MDV118 RRAB 0.777133
B

0 0.5 1

15.2 15.4 15.6 15.8 16

   MDV119 RRAB 0.633042
B

0 0.5 1

15.6 15.8 16 16.2 16.4

   MDV120 RRAB 0.477403
B

0 0.5 1

14.3 14.5 14.7 14.9

    MDV122 EB 0.323388
B

0 0.5 1

15.4

15.6

15.8

    MDV126 EB 0.649782
B

0 0.5 1

15.2 15.4 15.6 15.8

    MDV127 EA 1.55847
B

0 0.5 1

15.6 15.8 16 16.2

   MDV128 RRC 0.318133
B

0 0.5 1

15

15.5

16

     MDV129 EA 6.3593
B

0 0.5 1

16 16.2 16.4 16.6

   MDV131 RRC 0.386846
B

0 0.5 1

15

15.5

16

   MDV132 RRAB 0.599402
B

0 0.5 1

15.6

15.8 16

    MDV133 EB 0.404381
B

0 0.5 1

14.6 14.8 15 15.2 15.4

    MDV135 EA 1.20425
B

0 0.5 1

15.2 15.4 15.6 15.8 16

   MDV137 RRC 0.285936
B

0 0.5 1

13.8 14 14.2

    MDV138 EW 0.345281
B