0 0.5 1

14 14.1 14.2 14.3 14.4

     MDV438 EW 0.378665

B

0 0.5 1

15.3 15.4 15.5 15.6 15.7

     MDV439 EB 0.432024

B

0 0.5 1

15 15.2 15.4 15.6

    MDV441 HADS 0.0790113

B

0 0.5 1

15.4 15.5 15.6 15.7 15.8 15.9

     MDV442 EW 0.417669

B

0 0.5 1

15 15.2 15.4 15.6 15.8

     MDV443 RRC 0.250529

B

0 0.5 1

15.6 15.8 16

     MDV444 EW 0.350551

B

0 0.5 1

15.5

16

16.5

       MDV445 SR 95:

B

0 0.5 1

13.3 13.4 13.5 13.6

     MDV446 EW 0.357431

B

0 0.5 1

14.4 14.5 14.6 14.7 14.8 14.9

     MDV450 EB 0.585895

B

0 0.5 1

14.8 15 15.2 15.4

     MDV454 RRC 0.327441

B

0 0.5 1

14.7 14.8 14.9 15 15.1 15.2

     MDV455 RRC 0.200406

B

0 0.5 1

15.6 15.8 16 16.2 16.4 16.6 16.8

    MDV456 RRAB 0.511845

B

0 0.5 1

13.8 13.9 14 14.1

     MDV459 RRC 0.279441

B

0 0.5 1

14.4 14.6 14.8 15

      MDV460 EA 2.54351

B

0 0.5 1

14.1 14.15 14.2 14.25 14.3 14.35

     MDV461 EW 0.333834

B

0 0.5 1

15.4 15.6 15.8 16

     MDV463 EW 0.896409

B

0 0.5 1

15.6 15.8 16 16.2

     MDV464 RRC 0.222105

B

0 0.5 1

14.8 15 15.2 15.4 15.6 15.8

    MDV465 RRAB 0.607109

B